From c6ee6280596faa352004907941c44ff9ab308032 Mon Sep 17 00:00:00 2001
From: rusty <rusty@0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652>
Date: Fri, 17 Jan 2014 05:17:46 +0000
Subject: Fixes for first WD front page.

Based on feedback from Paul Knight <paul.knight@oasis-open.org>.

Signed-off-by: Rusty Russell <rusty@au1.ibm.com>

git-svn-id: https://tools.oasis-open.org/version-control/svn/virtio@184 0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652
---
 title.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'title.tex')

diff --git a/title.tex b/title.tex
index a60fd57..8d054d3 100644
--- a/title.tex
+++ b/title.tex
@@ -93,7 +93,7 @@ When referencing this specification the following citation format should be used
 
 \textbf{[VIRTIO-v\virtiorev]}\newline
 \textit{\virtioversion}. \virtioworkingdraftdate.
-\virtiodraftoasisstagename \virtiodraftstageextra{ }\virtiourlhtml
+\virtiodraftoasisstagename \virtiodraftstageextra . \virtiourlhtml .
 \end{oasistitlesection}
 
 \vfill\newpage
-- 
cgit v1.2.3

