From 8099431e7d41033a4bad912e86594306a06b2a6f Mon Sep 17 00:00:00 2001
From: mstsirkin <mstsirkin@0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652>
Date: Sun, 19 Oct 2014 10:19:29 +0000
Subject: title: add link to other work by TC

add:
Any other numbered Versions and other technical work produced by
the Technical Committee (TC) are listed at
https://www.oasis-open.org/committees/tc_home.php?wg_abbrev=virtio#technical.

Signed-off-by: Michael S. Tsirkin <mst@redhat.com>

git-svn-id: https://tools.oasis-open.org/version-control/svn/virtio@432 0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652
---
 title.tex | 4 ++++
 1 file changed, 4 insertions(+)

(limited to 'title.tex')

diff --git a/title.tex b/title.tex
index c9cdb95..37a2bd8 100644
--- a/title.tex
+++ b/title.tex
@@ -85,6 +85,10 @@ This specification replaces or supersedes:
 \begin{oasistitlesection}{Status}
 This document was last revised or approved by the Virtual I/O Device
 (VIRTIO) TC on the above date. The level of approval is also listed above. Check the ``Latest version'' location noted above for possible later revisions of this document.
+Any other numbered Versions and other
+technical work produced by the Technical Committee (TC) are
+listed at
+\url{https://www.oasis-open.org/committees/tc_home.php?wg_abbrev=virtio#technical}.
 
 Technical Committee members should send comments on this
 specification to the Technical Committee’s email list. Others
-- 
cgit v1.2.3

