From 336d94ff5958abbf926471610eee5006c85e9ed4 Mon Sep 17 00:00:00 2001
From: Stefan Hajnoczi <stefanha@redhat.com>
Date: Wed, 14 Mar 2018 15:46:15 +0000
Subject: packed-ring: fix capitalization of names

Names are capitalized, like the Element Length field.  General terms
like descriptor are not capitalized.

This patch fixes two instances where this is inconsistent.

Signed-off-by: Stefan Hajnoczi <stefanha@redhat.com>
Signed-off-by: Michael S. Tsirkin <mst@redhat.com>
Fixes: https://github.com/oasis-tcs/virtio-spec/issues/7
Approved-by: https://www.oasis-open.org/committees/ballot.php?id=3184
---
 packed-ring.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'packed-ring.tex')

diff --git a/packed-ring.tex b/packed-ring.tex
index 8640192..4e5c9b2 100644
--- a/packed-ring.tex
+++ b/packed-ring.tex
@@ -167,7 +167,7 @@ In a used descriptor, Element Address is unused. Element Length
 specifies the length of the buffer that has been initialized
 (written to) by the device.
 
-Element length is reserved for used descriptors without the
+Element Length is reserved for used descriptors without the
 VIRTQ_DESC_F_WRITE flag, and is ignored by drivers.
 
 \subsection{Scatter-Gather Support}
@@ -269,7 +269,7 @@ only valid flag for descriptors in the indirect table. Others
 are reserved and are ignored by the device.
 Buffer ID is also reserved and is ignored by the device.
 
-In Descriptors with VIRTQ_DESC_F_INDIRECT set VIRTQ_DESC_F_WRITE
+In descriptors with VIRTQ_DESC_F_INDIRECT set VIRTQ_DESC_F_WRITE
 is reserved and is ignored by the device.
 
 \subsection{In-order use of descriptors}
-- 
cgit v1.2.3

