From 2cea64ecf8a2183de439f02835c91622eaa27632 Mon Sep 17 00:00:00 2001
From: rusty <rusty@0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652>
Date: Wed, 26 Feb 2014 03:18:28 +0000
Subject: Feedback: move new device design section to Appendix.

It's non-normative.

Signed-off-by: Rusty Russell <rusty@au1.ibm.com>

git-svn-id: https://tools.oasis-open.org/version-control/svn/virtio@259 0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652
---
 main.tex | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'main.tex')

diff --git a/main.tex b/main.tex
index 314b0de..b1913d6 100644
--- a/main.tex
+++ b/main.tex
@@ -40,6 +40,8 @@
 
 \input{headerfile.tex}
 
+\input{newdevice.tex}
+
 % acknowledgements
 \input{acknowledgements.tex} 
 
-- 
cgit v1.2.3

