From a774e430022991d7bd45e9b625d78f3b5f8f1a69 Mon Sep 17 00:00:00 2001
From: rusty <rusty@0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652>
Date: Wed, 26 Feb 2014 03:19:12 +0000
Subject: Feedback: add old draft to normative references (VIRTIO-77)

Signed-off-by: Rusty Russell <rusty@au1.ibm.com>

git-svn-id: https://tools.oasis-open.org/version-control/svn/virtio@261 0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652
---
 introduction.tex | 3 +++
 1 file changed, 3 insertions(+)

(limited to 'introduction.tex')

diff --git a/introduction.tex b/introduction.tex
index 146042d..4ea4259 100644
--- a/introduction.tex
+++ b/introduction.tex
@@ -52,6 +52,9 @@ The key words "MUST", "MUST NOT", "REQUIRED", "SHALL", "SHALL NOT", "SHOULD", "S
 	PCI Express Specifications
 	\newline\url{http://www.pcisig.com/specifications/pciexpress/},
 	PCI-SIG\\
+	\phantomsection\label{intro:Virtio PCI Draft}\textbf{[Virtio PCI Draft]} &
+	Virtio PCI Draft Specification
+	\newline\url{http://ozlabs.org/~rusty/virtio-spec/virtio-0.9.5.pdf}\\
 \end{longtable}
 
 \section{Structure Specifications}
-- 
cgit v1.2.3

