From 490ccb611248ca4067a8a8b19336f05196d7a976 Mon Sep 17 00:00:00 2001
From: "cornelia.huck" <cornelia.huck@0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652>
Date: Wed, 26 Feb 2014 10:17:53 +0000
Subject: introduction: typo in terminology section

s/device/driver/ for the transitional driver description.

Signed-off-by: Cornelia Huck <cornelia.huck@de.ibm.com>

git-svn-id: https://tools.oasis-open.org/version-control/svn/virtio@282 0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652
---
 introduction.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'introduction.tex')

diff --git a/introduction.tex b/introduction.tex
index f266dc6..6e2b67f 100644
--- a/introduction.tex
+++ b/introduction.tex
@@ -54,7 +54,7 @@ To simplify transition and note differences, the following terms are used:
         \hyperref[intro:Virtio PCI Draft]{[Virtio PCI Draft]}
         specification, thus allowing legacy drivers.
 \item[Transitional Driver]
-        A device which implements both this specification and the older
+        A driver which implements both this specification and the older
         \hyperref[intro:Virtio PCI Draft]{[Virtio PCI Draft]}
         specification, thus allowing legacy devices.
 \item[Non-Transitional Device]
-- 
cgit v1.2.3

