From 4373909d0685327f18019e2a4cb91da512fbecc0 Mon Sep 17 00:00:00 2001
From: rusty <rusty@0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652>
Date: Tue, 3 Dec 2013 06:42:31 +0000
Subject: Formatting repair as per Chet's feedback.

1) Populate TC member list.
2) Remove Non-Normative References section
3) Fix URLs to point to correct place.

Signed-off-by: Rusty Russell <rusty@au1.ibm.com>

git-svn-id: https://tools.oasis-open.org/version-control/svn/virtio@153 0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652
---
 introduction.tex | 4 ----
 1 file changed, 4 deletions(-)

(limited to 'introduction.tex')

diff --git a/introduction.tex b/introduction.tex
index 60846b9..5ac71b2 100644
--- a/introduction.tex
+++ b/introduction.tex
@@ -44,9 +44,5 @@ The key words "MUST", "MUST NOT", "REQUIRED", "SHALL", "SHALL NOT", "SHOULD", "S
 	\phantomsection\label{intro:S390 Common I/O}\textbf{[S390 Common I/O]} & ESA/390 Common I/O-Device and Self-Description, \newline IBM Publication SA22-7204\\
 \end{longtable}
 
-
-\section{Non-Normative References}
-
-
 \newpage
 
-- 
cgit v1.2.3

