From b665b3165b454b98c782617e37a128b53b56c89c Mon Sep 17 00:00:00 2001
From: mstsirkin <mstsirkin@0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652>
Date: Thu, 26 Jun 2014 12:34:38 +0000
Subject: work around xetex bug

Too many \color directives produce corrupted output
and this warning:
WARNING ** Color stack overflow. Just ignore.

Use script to reduce # of these directives.

Signed-off-by: Michael S. Tsirkin <mst@redhat.com>

git-svn-id: https://tools.oasis-open.org/version-control/svn/virtio@389 0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652
---
 diffpreamble.tex | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'diffpreamble.tex')

diff --git a/diffpreamble.tex b/diffpreamble.tex
index 6dc177c..8abb737 100644
--- a/diffpreamble.tex
+++ b/diffpreamble.tex
@@ -13,6 +13,8 @@
 \providecommand{\DIFdelbegin}{\protect\color{red}}
 \providecommand{\DIFdelend}{\protect\color{black}}
 %DIF END COLOR PREAMBLE
+\providecommand{\DIFaddtext}[1]{\textcolor{blue}{\sf #1}}
+\providecommand{\DIFdeltext}[1]{\textcolor{red}{\footnotesize \sout{#1}}}
 
 %DIF FLOATSAFE PREAMBLE: SEEMS UNUSED BUT JUST IN CASE
 \providecommand{\DIFaddFL}[1]{\DIFadd{#1}}
-- 
cgit v1.2.3

