From b40a1b7145996811fcb20602925bae909f91a4a1 Mon Sep 17 00:00:00 2001
From: mstsirkin <mstsirkin@0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652>
Date: Mon, 10 Oct 2016 19:37:31 +0000
Subject: vsock: reserve device ID

Add a device ID for the Socket device.  The draft specification is
currently under review but it helps to reserve the ID to avoid
collisions with other new virtio devices.

VIRTIO-147

Suggested-by: Ian Campbell <ian.campbell@docker.com>
Signed-off-by: Stefan Hajnoczi <stefanha@redhat.com>
Message-Id: <1458729661-7514-1-git-send-email-stefanha@redhat.com>
Signed-off-by: Cornelia Huck <cornelia.huck@de.ibm.com>

git-svn-id: https://tools.oasis-open.org/version-control/svn/virtio/trunk@580 0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652
---
 content.tex | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'content.tex')

diff --git a/content.tex b/content.tex
index c362a5c..1da979a 100644
--- a/content.tex
+++ b/content.tex
@@ -3014,6 +3014,8 @@ Device ID  &  Virtio Device    \\
 \hline
 18         &   Input device \\
 \hline
+19         &   Socket device \\
+\hline
 \end{tabular}
 
 Some of the devices above are unspecified by this document,
-- 
cgit v1.2.3

