From a445ec1a4367808a636f23b39e060e72c21303b1 Mon Sep 17 00:00:00 2001
From: rusty <rusty@0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652>
Date: Thu, 5 Jun 2014 06:45:06 +0000
Subject: PCI: remove duplicate paragraph.

I chose the one which used the full nomenclature.

Signed-off-by: Rusty Russell <rusty@au1.ibm.com>

git-svn-id: https://tools.oasis-open.org/version-control/svn/virtio@377 0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652
---
 content.tex | 5 -----
 1 file changed, 5 deletions(-)

(limited to 'content.tex')

diff --git a/content.tex b/content.tex
index 7f1eecb..7c46e75 100644
--- a/content.tex
+++ b/content.tex
@@ -992,11 +992,6 @@ Drivers MUST match devices with the PCI Vendor ID 0x1AF4 and
 the PCI Device ID calculated by adding 0xFFF to the Virtio Device ID,
 as indicated in section \ref{sec:Device Types}.
 
-Drivers MUST match devices with any Revision ID, and
-MAY match devices with any Subsystem Vendor ID and
-Subsystem Device ID, this is to allow devices to be
-versioned without breaking drivers.
-
 Drivers MUST match any PCI Revision ID value.
 Drivers MAY match any PCI Subsystem Vendor ID and any
 PCI Subsystem Device ID value.
-- 
cgit v1.2.3

