From 8519c6e184e89d01ccc8ac2d968767fb9007aee3 Mon Sep 17 00:00:00 2001
From: rusty <rusty@0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652>
Date: Wed, 12 Feb 2014 03:18:27 +0000
Subject: VIRTIO-55: Add a reserved ID for GPU devices

As existing work on virtio-gpu is using device ID 16, reflect this in
the spec. This closes out VIRTIO-55.

As per minutes:
        https://lists.oasis-open.org/archives/virtio/201402/msg00121.html

Signed-off-by: Paul Mundt <paul.mundt@huawei.com>
Signed-off-by: Rusty Russell <rusty@au1.ibm.com>

git-svn-id: https://tools.oasis-open.org/version-control/svn/virtio@244 0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652
---
 content.tex | 2 ++
 1 file changed, 2 insertions(+)

(limited to 'content.tex')

diff --git a/content.tex b/content.tex
index 81160af..999ebbd 100644
--- a/content.tex
+++ b/content.tex
@@ -2425,6 +2425,8 @@ Device ID  &  Virtio Device    \\
 \hline
 12         &   virtio CAIF      \\
 \hline
+16         &   GPU device       \\
+\hline
 \end{tabular}
 
 Some of the devices above are unspecified by this document,
-- 
cgit v1.2.3

