From 74e8f144a4992e3b863feb0617e4d606a8e6686d Mon Sep 17 00:00:00 2001
From: mstsirkin <mstsirkin@0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652>
Date: Wed, 25 Jun 2014 12:25:39 +0000
Subject: pci: minor fomatting tweak

Make table look better. Drop spaces that make
latexdiff stumble.

Signed-off-by: Michael S. Tsirkin <mst@redhat.com>

git-svn-id: https://tools.oasis-open.org/version-control/svn/virtio@386 0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652
---
 content.tex | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'content.tex')

diff --git a/content.tex b/content.tex
index b7af387..f2a9e79 100644
--- a/content.tex
+++ b/content.tex
@@ -978,7 +978,8 @@ Devices MUST either have the PCI Device ID calculated by adding 0x1040
 to the Virtio Device ID, as indicated in section \ref{sec:Device
 Types} or have the Transitional PCI Device ID depending on the device type,
 as follows:
-\begin{tabular} { |l|c| }
+
+\begin{tabular}{|l|c|}
 \hline
 Transitional PCI Device ID  &  Virtio Device    \\
 \hline \hline
-- 
cgit v1.2.3

