From 35edda9f846d2351e0b3467e15b6f3fb34c4b436 Mon Sep 17 00:00:00 2001
From: rusty <rusty@0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652>
Date: Fri, 7 Feb 2014 00:20:28 +0000
Subject: block: legacy SCSI command fix.

When describing the historical layout requirements, it says
 "status field is a separate read-only buffer of size 1 byte, by itself."

That's clearly wrong, as it says above "The final status byte is written by the device"

Signed-off-by: Rusty Russell <rusty@au1.ibm.com>

git-svn-id: https://tools.oasis-open.org/version-control/svn/virtio@204 0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652
---
 content.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'content.tex')

diff --git a/content.tex b/content.tex
index 456b167..48c2d8e 100644
--- a/content.tex
+++ b/content.tex
@@ -3177,7 +3177,7 @@ errors, data_len, sense_len and residual reside in a single,
 separate write-only buffer; the sense field in a separate
 write-only buffer of size 96 bytes, by itself; the fields errors,
 data_len, sense_len and residual in a single write-only buffer;
-and the status field is a separate read-only buffer of size 1
+and the status field is a separate write-only buffer of size 1
 byte, by itself.
 
 
-- 
cgit v1.2.3

