From 185283a9a5e82e9ed71c22c1456c76f436be3ac7 Mon Sep 17 00:00:00 2001
From: rusty <rusty@0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652>
Date: Mon, 16 Jun 2014 11:51:13 +0000
Subject: small virtio-serial fix

nr_ports does not exist in the spec.

Signed-off-by: Paolo Bonzini <pbonzini@redhat.com>
Signed-off-by: Rusty Russell <rusty@au1.ibm.com>

git-svn-id: https://tools.oasis-open.org/version-control/svn/virtio@382 0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652
---
 content.tex | 3 +--
 1 file changed, 1 insertion(+), 2 deletions(-)

(limited to 'content.tex')

diff --git a/content.tex b/content.tex
index 19f1c32..9670976 100644
--- a/content.tex
+++ b/content.tex
@@ -3974,8 +3974,7 @@ only exist if VIRTIO_CONSOLE_F_MULTIPORT is set.
     are valid.
 
 \item[VIRTIO_CONSOLE_F_MULTIPORT (1)] Device has support for multiple
-    ports; \field{nr_ports} and \field{max_nr_ports} are
-    valid and control virtqueues will be used.
+    ports; \field{max_nr_ports} is valid and control virtqueues will be used.
 
 \item[VIRTIO_CONSOLE_F_EMERG_WRITE (2)] Device has support for emergency write.
     Configuration field emerg_wr is valid.
-- 
cgit v1.2.3

