From 42180b0ccf2de93537a74c39311b09333945d035 Mon Sep 17 00:00:00 2001
From: mstsirkin <mstsirkin@0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652>
Date: Mon, 22 Dec 2014 08:56:05 +0000
Subject: block: fixup section levels

The specification for the configuration layout for block devices
should be its own subsection as for all other devices and not be
hidden beneath "Feature bits".

The normative sections for device operation should appear under
the device operation section.

VIRTIO-125

Signed-off-by: Cornelia Huck <cornelia.huck@de.ibm.com>
Reviewed-by: Michael S. Tsirkin <mst@redhat.com>
Signed-off-by: Michael S. Tsirkin <mst@redhat.com>

git-svn-id: https://tools.oasis-open.org/version-control/svn/virtio/trunk@442 0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652
---
 conformance.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'conformance.tex')

diff --git a/conformance.tex b/conformance.tex
index 033481f..29c6ba8 100644
--- a/conformance.tex
+++ b/conformance.tex
@@ -282,7 +282,7 @@ Feature Bits / Legacy Interface: A Note on Feature Bits}
 \item Section \ref{sec:Device Types / Network Device / Device Operation / Control Virtqueue / Automatic receive steering in multiqueue mode / Legacy Interface: Automatic receive steering in multiqueue mode}
 \item Section \ref{sec:Device Types / Network Device / Device Operation / Control Virtqueue / Offloads State Configuration / Setting Offloads State / Legacy Interface: Setting Offloads State}
 \item Section \ref{sec:Device Types / Block Device / Feature bits / Legacy Interface: Feature bits}
-\item Section \ref{sec:Device Types / Block Device / Feature bits / Device configuration layout / Legacy Interface: Device configuration layout}
+\item Section \ref{sec:Device Types / Block Device / Device configuration layout / Legacy Interface: Device configuration layout}
 \item Section \ref{sec:Device Types / Block Device / Device Initialization / Legacy Interface: Device Initialization}
 \item Section \ref{sec:Device Types / Block Device / Device Operation / Legacy Interface: Device Operation}
 \item Section \ref{sec:Device Types / Console Device / Device configuration layout / Legacy Interface: Device configuration layout}
-- 
cgit v1.2.3

