From 99d4a38d77630d96c62b71494b38fcd8d975b06a Mon Sep 17 00:00:00 2001
From: mstsirkin <mstsirkin@0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652>
Date: Sun, 8 Dec 2013 22:21:51 +0000
Subject: commands-pdf.tex: align title page

Section titles are currently misaligned on the title
page. This patch aligns them back.

Signed-off-by: Michael S. Tsirkin <mst@redhat.com>

git-svn-id: https://tools.oasis-open.org/version-control/svn/virtio@168 0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652
---
 commands-pdf.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'commands-pdf.tex')

diff --git a/commands-pdf.tex b/commands-pdf.tex
index 1646adb..8e278be 100644
--- a/commands-pdf.tex
+++ b/commands-pdf.tex
@@ -64,7 +64,7 @@
 
 \newenvironment{oasistitlesection}[1]
 {
-\begin{tabular}{p{0in}p{5.8in}}
+\setlength{\tabcolsep}{0in}\begin{tabular}{p{0in}p{5.8in}}
 \multicolumn{2}{l}{\fontspec[Color=552681]{Arial}\fontsize{10}{10}\textbf{#1:}}\\[-0.05in]
 &\setlength{\topsep}{0in}\setlength{\parsep}{0in}\setlength{\partopsep}{0in}   }
 {
-- 
cgit v1.2.3

