From c6ee6280596faa352004907941c44ff9ab308032 Mon Sep 17 00:00:00 2001
From: rusty <rusty@0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652>
Date: Fri, 17 Jan 2014 05:17:46 +0000
Subject: Fixes for first WD front page.

Based on feedback from Paul Knight <paul.knight@oasis-open.org>.

Signed-off-by: Rusty Russell <rusty@au1.ibm.com>

git-svn-id: https://tools.oasis-open.org/version-control/svn/virtio@184 0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652
---
 commands-html.tex | 1 +
 1 file changed, 1 insertion(+)

(limited to 'commands-html.tex')

diff --git a/commands-html.tex b/commands-html.tex
index ade2dd7..7831866 100644
--- a/commands-html.tex
+++ b/commands-html.tex
@@ -41,6 +41,7 @@
 
 \newcommand{\oasisnoticelabel}[1]
 {
+\hrule
 \begin{spacing}{2}
 \HCode{<div style="color: \#552681;  font-size: 18pt;">}
 \textbf{#1}
-- 
cgit v1.2.3

