From 3a7719016f0b081ac43203e9137796265f6a037b Mon Sep 17 00:00:00 2001
From: rusty <rusty@0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652>
Date: Wed, 12 Feb 2014 03:15:33 +0000
Subject: Feedback #5: Applied.

As per minutes:
	https://lists.oasis-open.org/archives/virtio/201402/msg00121.html

Signed-off-by: Rusty Russell <rusty@au1.ibm.com>

git-svn-id: https://tools.oasis-open.org/version-control/svn/virtio@236 0c8fb4dd-22a2-4bb5-bc14-6c75a5f43652
---
 abstract.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'abstract.tex')

diff --git a/abstract.tex b/abstract.tex
index b42a0b6..186fb81 100644
--- a/abstract.tex
+++ b/abstract.tex
@@ -1,7 +1,7 @@
 This document describes the specifications of the “virtio” family of
 devices. These devices are found in virtual environments, yet by
 design they are not all that different from physical devices, and this
-document treats them as such. This allows the guest to use standard
+document treats them as such. This similarity allows the guest to use standard
 drivers and discovery mechanisms.
 
 The purpose of virtio and this specification is that virtual
-- 
cgit v1.2.3

